configuration based functionality to be introduced for Manually Update Pulmonary result for medical examination.

1) Checkbox should be introduced in Pulmonary examination screen, when checked true it should allow user to modify the result calculated by the software.
2) modified result should also update software calculated result and the same will be displayed in all respective reports.
3) If data update from pulmonary Update screen and for the same record data had been modified manually then updated values should not modify pulmonary result.

Configuration Key name:-
Configuration Description:- 

