1. Validation msg appears 6 times.
A) Examination_Date is not proper, on line 4 ! 
B) Setup_Name is not proper on line 3 ! (if Store Location is incorrect)

2. VDRLResult, WIDALResult, PSAResult will not return validations if special characters are provided.

3. FVC, FEV1, PEFR accepts negative values.

4. duplicate Code exists on 2 ! needs to be replaced by "Duplicate Code exists in line 2 !"

5. Validations for ElbowWidth/AbdominalGirth/Waist/Hip & Process Type needs to be removed

6. Nalagarh Client Issue : RegEdit Updated in click2health still page returns
Syntax Error: Missing operand after 's' operator.
/JavaScript/rjs/pagejs/examination_imports.js:180

7. Columns to be inserted in Sheet:
A. UTS_Result (List Type: Normal/Abnormal)
B. UTS_Remark (Text Column)
C. Trop T (List Type: Positive/Negative)
D. LDH (Decimal Range: 140-280)
E. CPK MB (Decimal range: 5-25)
F. Pregnancy Test (List Type: Positive/Negative)
G. HbAsg (List Type: Negative/Positive)

8. Remove Notes:
Note : In all Import Template Orgname means Sub Location 
You have to put Sub Location in Orgname column
 