body a {
    color: #0088cc;
   
}

.entry p a strong {
    color: #0088cc !important;
}
h1, h2, h3, h4, h5, h6 {
    
    color: #08c;
   
}
h1 a:hover, h2 a:hover, h3 a:hover, h4 a:hover {
    color: #0088cc;
    text-decoration: none;
}
.sidebar-container .widget_archive a:hover, .sidebar-container .widget_categories a:hover {
    background: #0088cc00;
    color: #000;
   }
.sidebar-container a:hover {
    color: #0088cc;
   
}
.post-meta a:hover {
    color: #0088cc;
}
.col {
    margin: 0 0 0% 1.6%;
   }
#footer-wrap a:hover {
    color: #ffffff;
    text-decoration: none;
}
.loop-entry-thumbnail img {
    width: 640px;
}
div#main {
    /* z-index: -999; */
    margin-top: 70px;
}
.entry.clr li {
    list-style-type: none;
}
.entry h2, .entry h3, .entry h4, .entry h5, .entry h6 {
    margin: 20px 0 20px;
}
.img-shadow-new{
	min-height: 230px; vertical-align: middle; display: flex; border: 1px solid #eaeaea; padding: 20px;
	box-shadow: 2px 2px 16px 10px #a8a8a84d;
}
.main-shadow{
	 box-shadow: 2px 2px 16px 10px rgba(168,168,168,0.3);
	padding: 30px;
}
p {
   
    color: #000000;
}
.wpex-readmore a {
    display: block;
    float: left;
    background: #0073a8;
    color: #fff;
    padding: 5px;
    border-radius: 5px;
}
@media screen and (max-width: 600px) {
.left-content {
    float: left;
    width: 100% !important;
}
}